

\documentstyle[12pt,epsf]{article}
\pagestyle{plain}
\tolerance=10000
\renewcommand{\baselinestretch} [0] {0.95}
\setlength {\textheight}{24.0cm}
\setlength {\topmargin}{-3.0cm}
\setlength {\textwidth}{17.0cm}
\setlength {\hoffset}{1.5cm}
\setlength {\evensidemargin}{-2cm}
\setlength {\oddsidemargin}{-2cm}
\parskip 0pt

\begin{document}




\vspace*{0.5cm}
\begin{center}
{\large \bf Title of the Abstract}
\end{center}

\begin{center}
Walter Well$^1$, {\underline{David Dot}$^1$}, and Bernard
Barrier$^2$
% First Author, {\underline{Presenting Author$^1$}},
%Second Author$^2$, Third Author$^1$
\end{center}

\begin{center}
{\em $^1$ Continuum State University, P.O.Box 0100, Atlanta,
USA}\\
 {\em $^2$ Bound State Research Institute,  P.O.Box 0010,
London, UK}

\end{center}


This is a LaTeX template for preparing abstracts for the QWIP 2002
Workshop on Quantum Well Infrared Photodetectors [1,2].

Please check that:


\begin{itemize}

    \item The name of the person presenting the contribution at the
conference has been underlined.

  \item The body of abstract contains maximum 500 words



\end{itemize}


Please send the resulting text file by e-mail to
QWIP2002@polito.it as an ASCII text attachment.

\vspace*{0.5cm}

\setlength \parindent{0 cm}

%Insert references here. Remember a blank line between each pair of
%references. Use the format indicated.

[1] W.Well, D.Dot and B.Barrier Appl. Phys. Lett. {\bf 90}, 469
(1999).

[2] D.Dot, B.Barrier and W.Well, Infr. Phys. and Tech., {\bf 42},
547 (2000).


\end{document}
